PCB Calculator

The KiCad Team

Reference manual

Copyright

This document is Copyright © 2019 by it’s contributors as listed below. You may distribute it and/or modify it under the terms of either the GNU General Public License (http://www.gnu.org/licenses/gpl.html), version 3 or later, or the Creative Commons Attribution License (http://creativecommons.org/licenses/by/3.0/), version 3.0 or later.

Contributors

Heitor de Bittencourt. Mathias Neumann

Feedback

Please direct any bug reports, suggestions or new versions to here:

About KiCad document: https://gitlab.com/kicad/services/kicad-doc/issues

About KiCad software: https://gitlab.com/kicad/code/kicad/issues

About KiCad software i18n: https://gitlab.com/kicad/code/kicad-i18n/issues

Publication date and software version

March 05 2020

1. Introduction

The KiCad PCB Calculator is a set of utilities to help you find the values of components or other parameters of a layout. The Calculator has the following tools:

Regulators

Track Width

Electrical Spacing

Trans Line

RF Attenuators

Color Code

Board Classes

2. Calculators

2.1. Regulators

This calculator helps with the task of finding the values of the resistors needed for linear and low-dropout voltage regulators.

For the Standard Type, the output voltage Vout as a function of the reference voltage Vref and resistors R1 and R2 is given by:

For the 3 terminal type, there is a correction factor due to the quiescent current Iadj flowing from the adjust pin:

This current is typically below 100 uA and can be neglected with caution.

To use this calculator, enter the parameters of the regulator Type, Vref and, if needed, Iadj, select the field you want to calculate (one of the resistors or the output voltage) and enter the other two values.

2.2. Track-Width

The Track Width tool calculates the trace width for printed circuit board conductors for a given current and temperature rise. It uses formulas from IPC-2221 (formerly IPC-D-275).

2.3. Electrical-Spacing

This table helps finding the minimum clearance between conductors.

Each line of the table has a minimum recomended distance between conductors for a given voltage (DC or AC peaks) range. If you need the values for voltages higher than 500V, enter the value in the box in the left corner and press Update Values.

2.4. TransLine

Transmission line theory is a cornerstone in the teaching of RF and microwave engineering.

In the calculator you can choose different sorts of Line Types and their special parameters. The models implemented are frequency-dependent, so they disagree with simpler models at high enough frequencies.

This calculator is heavilly based on Transcalc.

The transmission line types and the reference of their mathematical models are listed below:

Microstrip line:

H. A. Atwater, “Simplified Design Equations for Microstrip Line Parameters”, Microwave Journal, pp. 109-115, November 1989.

Coplanar wave guide.

Coplanar wave guide with ground plane.

Rectangular waveguide:

S. Ramo, J. R. Whinnery and T. van Duzer, "Fields and Waves in Communication Electronics", Wiley-India, 2008, ISBN: 9788126515257.

Coaxial line.

Coupled microstrip line:

H. A. Atwater, “Simplified Design Equations for Microstrip Line Parameters”, Microwave Journal, pp. 109-115, November 1989.

M. Kirschning and R. H. Jansen, "Accurate Wide-Range Design Equations for the Frequency-Dependent Characteristic of Parallel Coupled Microstrip Lines," in IEEE Transactions on Microwave Theory and Techniques, vol. 32, no. 1, pp. 83-90, Jan. 1984. doi: 10.1109/TMTT.1984.1132616.

Rolf Jansen, "High-Speed Computation of Single and Coupled Microstrip Parameters Including Dispersion, High-Order Modes, Loss and Finite Strip Thickness", IEEE Trans. MTT, vol. 26, no. 2, pp. 75-82, Feb. 1978.

S. March, "Microstrip Packaging: Watch the Last Step", Microwaves, vol. 20, no. 13, pp. 83.94, Dec. 1981.

Stripline.

Twisted pair.

2.5. RF-Attenuators

With the RF Attenuator utility you can calculate the values of the resistors needed for different types of attenuators:

PI

Tee

Bridged Tee

Resistive Splitter

To use this tool, first select the type of attenuator you need, then enter the desired attenuation (in dB) and input/output impedances (in Ohms).

2.6. Color-Code

This calculator helps translating the color bars from the resistor to its value. To use it, first select the tolerance of the resistor: 10%, 5% or equal or smaller than 2%. For example:

Yellow Violet Red Gold: 4 7 x100 ±5% = 4700 Ohm, 5% tolerance

1kOhm, 1% tolerance: Brown Black Black Brown Brown

2.7. Board-Classes

Performance Classes

In IPC-6011 have been three performance classes established

Class 1 General Electronic Products Includes consumer products, some computer and computer peripherals suitable for applications where cosmetic imperfections are not important and the major requirement is function of the completed printed board.

Class 2 Dedicated Service Electronic Products Includes communications equipment, sophisticated business machines, instruments where high performance and extended life is required and for which uninterrupted service is desired but not critical. Certain cosmetic imperfections are allowed.

Class 3 High Reliability Electronic Products Includes the equipment and products where continued performance or performance on demand is critical. Equipment downtime cannot be tolerated and must function when required suchas in life support items or flight control systems. Printed boards in this class are suitable for applications where high levels of assurance are required and service is essential.

PCB Types

In IPC-6012B there are also 6 Types of PCB defined:

Printed Boards without plated through holes (1)

1 Single-Sided Board

And Boards with plated through holes (2-6)

2 Double-Sided Board

3 Multilayer board without blind or buried vias

4 Multilayer board with blind and/or buried vias

5 Multilayer metal core board without blind orburied vias

6 Multilayer metal core board with blind and/orburied vias